Interpolating IGS Ionosphere and Troposphere Values

IGS ionosphere map and troposphere delay values are given at 2-hour intervals, speci^cally for the times 01:00, 03:00, 05:00, ..., 23:00 UT. The user of these IGS products interested in a parameter representation which is continuous in time may ask the following questions:

• What is the recommended interpolation method?

• How shall he proceed with epochs before 01:00 and after 23:00 UT?

(a) Piece-wise, constant functions (b) Piece-wise, linear functions